SymDiag dialogs

Location:	Tools / Maintenance Utility

Resource File:	Tools / Symdiag.rc

Dialog ID:

Notes:


Restore Default Settings button
Click here if you want to reset default WinFax settings which have been changed or have become corrupted. Default settings available for resetting include: the Message Manager toolbar; the Fax Viewer toolbar; the Cover Page Designer toolbar; the Message Manager Sidebar toolbar; Email Configuration; the Send dialog; the Attachments dialog; Logs MDI settings; Phonebooks MDI settings; and the Suppress Warnings registry key.


Launch Application Go button
Click here to run or open the selected application.


Launch Application Close button
Click here to close the Launch Application Or Applet dialog box.


Enable/Disable Features button
WinFax Support Technician tool. Use with caution. Incorrect use of this tool may cause damage to your WinFax files.


Enable button
Click here to enable the selected feature.


Launch Application Or Applet button
Click here to launch a WinFax maintenance utility or program. Applications available include: the Rebuild Phonebooks/Logs utility; the Optimize Phonebooks/Logs utility; WinFax program Setup; the remote station PING utility; the WinFax Printer Driver Installer; and the Cover Page/Fax Attachments Database Repair utility.


Log System Information button
WinFax Support Technician tool. Use with caution. Incorrect use of this tool may cause damage to your WinFax files.


Disable button
Click here to disable the selected feature.


Move Data Directory Location button
Click here if you wish to move your WinFax Data directory to a new location. You might want to do this, for example, if you want to move the directory to a drive where you have more available space.


Enable and Disable Features Close button
Click here to close the Enable/Disable Features dialog and return to the main SymDiag Maintenance Utility dialog.


Default Settings Reset button
Click here to reset the selected option to its original WinFax default settings.


Log System Information OK button
Click here to confirm your selections and close the Log System Information dialog box.


Log System Information Cancel button
Click here to cancel your log file selections and close the Log System Information dialog box.


User Information Close button
Click here to close the User Information dialog.


Open Log button
WinFax Support Technician tool. Use with caution. Incorrect use of this tool may cause damage to your WinFax files.


Log System Information Select All button
Click here to include all available items in your log file.


Log System Information Remove All button
Click here to include none of the available items in your log file.


Generating Log File Close button
Click here to close the Generating Log File dialog.


Move Data Close button
Click here to close the Move Data Directory Location dialog.


Move Data OK button
Click here to move your WinFax data files to the directory specified, and close the Move Data Directory Location dialog.


Move Data Browse button
Click here to browse to select the new directory path to which you would like to move your WinFax data files


View Log button
Click here to view the generated system log file.


Print Log button
Click here to print the generated system log file to your default printer.


Main Dialog Close button
Click here to close the SymDiag Maintenance Utility.


About button
Click here for SymDiag version information.


About SymDiag Close button
Click here to close the About SymDiag dialog, and return to the main SymDiag Maintenance Utility dialog.


Enable and Disable Features list box
Lists all WinFax features which can be enabled or disabled using this maintenance utility.


Log System Information list box
Lists all items which can be included in your log file.


Launch Application list box
Lists applications which may be run using this maintenance utility.


Default Settings list box
Lists all WinFax settings which may be restored to their original default settings using this maintenance utility.


User Information Name field
Type your full name.


User Information Company field
Type the name of your company, if applicable.


User Information Email field
Type your email address.


User Information Phone Number field
Type your telephone number, including area code where applicable.


User Information Attention field
Type the name of the person or department to whom any correspondance should refer.


User Information Fax Number field
Type your fax number, including area code where applicable.


User Information Contact field
Type the relevant contact identification, if applicable.


User Information Case field
Type the relevant case number.


Generating Log Log Destination Folder field
Indicates the directory path location of the newly generated system log file.


Move Data Current Directory field
Type the directory path where your WinFax data files are currently stored.


Move Data New Directory field
Type or browse to select the new directory path to which you would like to move your WinFax data files.


Generating Log Current Operation field
Indicates the operation currently in progress.


Control Panel radio button
Click here if you want to run a Control Panel application.


Windows radio button
Click here if you want to run a Windows 95/98 application.


Windows NT radio button
Click here if you want to run a Windows NT/2000 application.


WinFax radio button
Click here if you want to run a WinFax application.